1 ARRAY_LAYOUT Create an interferometer configuration file from input parameters
        ARRAY_LAYOUT

    This task creates a configuration file from the input parameters (number
    of antennas, latitude,...) and the kind of array to be used:

      1 = compact
      2 = disk + random
      3 = ring
      4 = ring + random
      5 = reuleaux triangles
      6 = reuleaux triangles + random
      7 = spiral

1 ENDOFHELP



















































