
1 PLAIT Plait two input images or cubes to decrease strip level
        PLAIT

    Performs  a  PLAIT algorithm on the input data cubes. Up to 5 data cubes
    can be plaited. It is up to the user to ensure that  inpute  files  have
    the  same axe conversion rules. If a blank value is encoutered, the task
    stops. It is up the user to interpolate to eliminate blank values.

2 NAME_1$

        Name of input data cube number 1.

2 NAME_2$

        Name of input data cube number 2.

2 NAME_3$

        Name of input data cube number 3.

2 NAME_4$

        Name of input data cube number 4.

2 NAME_5$

        Name of input data cube number 5.

2 O_NAME$

        Output file name.

2 NFILE$

        The number of input files (NFILE$.LE.5).

2 THETA$

        Orientation of the input files in degrees.

2 LENGTH$

        Characteristic lengths of the stripes in each input file. Unit:  RA-
    DIAN.

2 CUTOFF$

        Thresholds  (low  and  high  cuts)  applied to the input data cubes.
    Blank and threshold pixels in cube 'i' are replaced by the value of  the
    mean of the input cubes.

2 BLANK$

        Blanking value of input cubes, assumed to be identical for all input
    cubes.

1 ENDOFHELP








