1 UV_ADDNOISE Add noise to a UV table,
        UV_ADDNOISE

      Add noise to a UV table, according to the weights of a specified chan-
    nel, with an optional scale factor.

2 UVTABLE$
        TASK\FILE       "UV Table" UVTABLE$

    UV Table to be used.

2 WCOL$
        TASK\INTEGER "Weight channel " WCOL$

    Channel to be used to get the noise.

2 FACTOR$
        TASK\REAL "Scale factor" FACTOR$

    Scale factor on noise.
1 ENDOFHELP













































