1 UV_APPLYPHASE Apply a gain solution to a UV table.
        UV_APPLYPHASE

            Apply  phase  correction  to a UV table. The first UV table con-
    tains the gain correction, the second the visibilities to be  corrected.
    Works only for one channel for the time being...

2 INPUT$
        TASK\FILE       "Input UV Sample Table" INPUT$

    Gain correction table
2 OUTPUT$
        TASK\FILE       "Output UV Model Table" OUTPUT$

    UV table to be corrected
2 AMP_CORRECT$
        TASK\LOGICAL    "Normalize amplitude?" AMP_CORRECT$

    Also applies amplitude correction if set to NO.
1 ENDOFHELP














































