1 UV_CCMODEL Create a model UV table from a Clean Component List.
        UV_CCMODEL

    Use  a  Clean Component Table produced by WRITE CCT (in Mapping) to com-
    pute a UV table from an input UV coverage. It can also be used  to  sub-
    tract the Clean Components from a UV table to compute the residuals.

2 UVSAMPLE$
        TASK\CHARACTER "Input UV coverage" UVSAMPLE$

    A UV table which is used to define the UV coverage. It can be created by
    Astro, or can be a real UV table from observations.

2 CLEAN$
        TASK\CHARACTER "Input CLEAN Component Table" CLEAN$

    The Clean Component Table from the Mapping program  or  from  the  CLEAN
    Task.
2 UVMODEL$
        TASK\CHARACTER "Output UV table" UVMODEL$

    The output UV table to contain the corresponding visibilities.

2 FREQUENCY$
        TASK\CHARACTER "Frequency" FREQUENCY$

    The desired model frequency
2 SUBTRACT$
        TASK\LOGICAL "Subtract Clean Components" SUBTRACT$

    Should  the  Clean  Component  be subtracted ?  This allows to compute a
    residual UV table, when the input UV table is an observation.
1 ENDOFHELP

































