1 UV_CCT  (Obsolete?, see UV_CCMODEL) Create a UV table from clean image
        UV_CCT

    Compute a UV table from a Clean Component Table. See also UV_CCMODEL.

2 UVSAMPLE$
        TASK\FILE       "Input UV Sample Table" UVSAMPLE$

    Input UV table defining the UV coverage
2 IMAGE$
        TASK\FILE       "Input .VLM Cube "      IMAGE$

    Name of the input data cube, in X,Y, Velocity order and associated Clean
    Component Table
2 UVMODEL$
        TASK\FILE       "Output UV Model Table" UVMODEL$

    Resulting UV table
2 CHANNEL$
        TASK\INTEGER    "Channel used"          CHANNEL$

    Channels to be used
2 FLUX$ TASK\REAL "Total  Flux " FLUX$

    Total source flux. Allows re-scaling from an existing image.
2 POINT$
        TASK\LOGICAL "Point source ?" POINT$

    Is the source a point source ?  If so the file name is ignored, and  the
    total flux is used as the point source flux to compute the visibilities.

1 ENDOFHELP


































