1 UV_PLUGC Plug continuum averaged visibilities into a line UV table

        UV_PLUGC  puts a time average continuum UV table into the last chan-
    nel of a spectral line one. It is intended for  specific  purposes  wher
    having  the  continuum  and line data in the same table is required. The
    weights of the continuum data is kept also.
2 UV_TABLE$
        TASK\CHARACTER "UV table" UV_TABLE$

    UV table into which the continuum must be plugged. .
2 SELF$
        TASK\CHARACTER "UV table used as continuum" SELF$

    UV table where continuum information is located.
2 DTIME$
        TASK\REAL"The smoothing time constant in seconds" DTIME$

    Integration time to derive continuum value.

2 WCOL$
        TASK\INTEGER "The continuum channel" WCOL$

    If the "continuum" UV table SELF$  is  actually  a   spectral   line  UV
    table,  spectral channels to be used to define the continuum.
2 SUB$
        TASK\REAL "Fraction of the continuum source to consider" SUB$

    Normally 1, but can be used to rescale the continuum data.

1 ENDOFHELP




































