1 UV_POINTING Simulate pointing errors
        UV_POINTING

         Fast pointing error simulation based on  gridded interpolation
         from the Fourier Transform of an image

2 UVSAMPLE$
        TASK\FILE      "Input UV Sample Table"    UVSAMPLE$

    UV Table containing the UV coverage
2 IMAGE$
        TASK\FILE      "Input .LMV Cube "         IMAGE$

    The input model image(s)
2 UVMODEL$
        TASK\FILE      "Output UV Model Table"    UVMODEL$

    Resulting UV table
2 FREQUENCY$
        TASK\REAL      "UV Model Table frequency" FREQUENCY$

    Observing frequency for the simulation
2 MOSAIC$
        TASK\LOGICAL   "Mosaic observations?"     MOSAIC$

    Indicates whether the observation is a single field or a mosaic
2 CODE$
        TASK\INTEGER   "Pointing model"           CODE$

    A code from 1 to 5 indicating the pointing model.
2 POINTING$
        TASK\CHARACTER "Pointing error file"      POINTING$

    The pointing error file
2 ERRORS$
        TASK\REAL      "Pointing Errors"          ERRORS$[2]

    The scale factors for the pointing errors
2 PRIMARY$
        TASK\REAL      "Half-Power Beam Width"    PRIMARY$

    The primary beam Full Width at Half Power.

1 ENDOFHELP






















