1 UV_SINUSPHASE Create a model UV table with sinusoidal phase variation

    Used in ALMA simulator during its debugging, and perhaps in some version
    still nowadays...
        UV_SINUSPHASE

2 DECLINATION$
        TASK\DOUBLE  "" DECLINATION$

2 FREQUENCY$
        TASK\DOUBLE  "" FREQUENCY$

2 NEW$
        TASK\LOGICAL "" NEW$

2 UV_TABLE$
        TASK\FILE    "" UV_TABLE$

2 STATION_FILE$
        TASK\FILE    "" STATION_FILE$

2 UV_SPACING$
        TASK\REAL    "" UV_SPACING$

2 DIAMETER$
        TASK\REAL    "" DIAMETER$

2 HORIZON$
        TASK\REAL    "" HORIZON$

2 LATITUDE$
        TASK\DOUBLE  "" LATITUDE$

2 HOUR$
        TASK\REAL    "" HOUR$

2 INTEGRATION$
        TASK\REAL    "" INTEGRATION$

2 BANDWIDTH$
        TASK\REAL    "" BANDWIDTH$

2 TREC$
        TASK\REAL    "" TREC$

2 TAU$
        TASK\REAL    "" TAU$

2 PHASE$
        TASK\REAL    "" PHASE$

1 ENDOFHELP














