1 UV_SOLVE Compute a gain solution from a calibrator UV table

        UV_SOLVE

           Compute a gain solution from a calibrator UV table

2 CALIBRATOR$
        TASK\CHAR  "Calibrator UV table"  CALIBRATOR$

    Name of the calibrator UV table
2 RESULT$
        TASK\CHAR  "Temporary result"  RESULT$

    Name of a temporary file holding some data

2 RAW$
        TASK\CHAR  "Raw UV table"  RAW$

    UV table for which the gain solution should be computed
2 CAL$
        TASK\CHAR  "Calibrated UV table" CAL$

2 SOLVE_AMP$
        TASK\LOGI  "Solve Amplitude"  SOLVE_AMP$

    Compute amplitude gain correction
2 SOLVE_PHASE$
        TASK\LOGI  "Solve Phase"  SOLVE_PHASE$

    Compute phase correction
2 APPLY_AMP$
        TASK\LOGI  "Apply Amplitude"  APPLY_AMP$

    Correct for amplitude gain
2 APPLY_PHASE$
        TASK\LOGI  "Apply Phase"  APPLY_PHASE$

    Correct for phase
2 FUNCTION$
        TASK\INTE  "Spline or Polynom"  FUNCTION$ /INDEX Spline Polynom

    Interpolation method
2 ORDER$
        TASK\REAL  "Order or Time step in hours"  ORDER$

    Polynom order, or time step for the Spline.
1 ENDOFHELP



















