1 UV_SPLITFIELD Split a multi-field UV table into a series of single fields
        UV_SPLITFIELD

    Use  for  ALMA simulation. Splits a special UV table containing data for
    overlapping fields into separate, single field UV tables.
2 INPUT$
        TASK\FILE       "Input UV Sample Table" INPUT$

    Multi-field UV table

2 OUTPUT$
        TASK\FILE       "Sorted UV Tables generic name" OUTPUT$

    UV table created for each field
2 FIELD$
        TASK\INTEGER    "Number of fields" FIELDS$

    Number of fields (should be specified)
1 ENDOFHELP















































