1 UV_TABLE Compute a Nyquist sampled UV table from a model data cube
        UV_TABLE

    Compute  a UV table from an input image (3-D data cube are allowed).  It
    differs from UV_MODEL in producing UV data on a critically sampled  rec-
    tangular  grid  rather than along user specified tracks. It is typically
    used to analyse image plane observational data with UV tools.

2 IMAGE$
        TASK\FILE "Input .VLM Cube" IMAGE$

    Image from which the model UV table must be computed. It  should  be  in
    the order Velocity, RA, Dec.

2 UVMODEL$
        TASK\FILE "Output UV Model Table" UVMODEL$

    Output UV table, i.e. the Fourier transform of the IMAGE$ sampled on the
    coordinates specified in the sample UV table UVSAMPLE$ .

1 ENDOFHELP













































