1 UV_TIMEAVERAGE Smooth a UV table according to time

        Smooth a UV table according to time.

2 INPUT$
        TASK\FILE       "Input UV Sample Table" INPUT$

    Input UV table
2 OUTPUT$
        TASK\FILE       "Output UV Model Table" OUTPUT$

    Output (time smoothed) UV table
2 NTIME$
        TASK\REAL       "Smoothing time (sec)"  NTIME$

    Smoothing time constant in seconds
2 DO_DECORR$
        TASK\LOGI       "Correct for decorrelation?" DO_DECORR$

    If  the  input UV table is from a simulation, it may contain information
    upon the true phases. Logical DO_DECORR$ indicates whether the output UV
    table  should be corrected for the decorrelation due to the time averag-
    ing or not.

1 ENDOFHELP









































